py 0 1 2 3 4 5 6 7 8 9 10

y> δ Rapidity loss <

0 0.5 1 1.5 2 2.5 3 3.5

E917 E802/E866 NA49 (PbPb) BRAHMS 62.4 GeV BRAHMS 200 GeV

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 0 10 20 30 40 50 60

net-baryons 62.4 GeV