-0.5 0 0.5 1 1.5 2 2.5 3 3.5 4 10 20 30 40 p

p-bar

y -0.5 0 0.5 1 1.5 2 2.5 3 3.5 4 0 10 20 30 40 62 GeV Au+Au

net-p

dN/dy dN/dy