0 0.5 1 1.5 2 2.5

-210

-110 1 10 -0.1 < y < 0.1

0 0.5 1 1.5 2 2.5

-210

-110 1 10 2.2 < y < 2.5

p p-bar

0.4 < y < 0.9

62 GeV Au+Au

0 0.5 1 1.5 2

-210

-110 1 10 2.94 < y < 3.1

]^{-2} [(GeV/c) T dy dp T pπ2

N^2d evN1

[GeV/c] Tp