[GeV/c]

Tp^{1 2 3 4 5}

CPR

0

0.5

1

1.5

2 = 3.2 η^-h

[GeV/c]

Tp^{1 2 3 4 5}

CPR

0

0.5

1

1.5

2 = 2.2 η^-h

[GeV/c]

Tp^{1 2 3 4 5}

CPR

0

0.5

1

1.5

2 = 1 η 2 -+h^+h

[GeV/c]

Tp^{1 2 3 4 5}

CPR

0

0.5

1

1.5

2

0-20%/60-80%

30-50%/60-80%

= 0 η 2 -+h^+h