-6 -4 -2 0 2 4 6

-1.3

-1.2

-1.1 -1 -0.9

-0.8

-0.7

-0.6

Chi2 / ndf = 0.08741 / 3 0.02565 ± Const = -0.9162 0.007337 ± Slop = 0.08139

run #5037

Y deviation for T3T2

± ± dy offset [cm]

y [cm]