-10 -8 -6 -4 -2 0 2 4 6 8 10

counts

0

5

10

15

20 25 dMom1 Nent = 230 Mean = -0.4456 RMS = 0.949 Chi2 / ndf = 36.12 / 34 1.092 ± Const = 12.99 0.05883 ± Mean = -0.451 0.05891 ± Sigma = 0.8345

P= 12.3 GeV/c

dMom1

± ± ±

-10 -8 -6 -4 -2 0 2 4 6 8 10 0

10

20

30

40 50 dMom2 Nent = 349 Mean = -0.3587 RMS = 0.7553 Chi2 / ndf = 28.82 / 34 1.971 ± Const = 42.15 0.02624 ± Mean = -0.3238 0.01974 ± Sigma = 0.6725

P= 10.9 GeV/c

dMom2

± ± ±

-10 -8 -6 -4 -2 0 2 4 6 8 10 0 20 40 60 80 100 120 140 dMom3 Nent = 395 Mean = -0.3307 RMS = 0.597 Chi2 / ndf = 58.16 / 35 3.789 ± Const = 127.8 0.01308 ± Mean = -0.3418 0.009437 ± Sigma = 0.5388

P= 9.5 GeV/c

dMom3

± ± ±

-10 -8 -6 -4 -2 0 2 4 6 8 10 0 50 100 150 200 250 300 350 400 450 dMom4 Nent = 385 Mean = -0.274 RMS = 0.4642 Chi2 / ndf = 56.75 / 31 7.334 ± Const = 341.2 0.007145 ± Mean = -0.2799 0.006009 ± Sigma = 0.4331

P= 8.1 GeV/c

dMom4

± ± ±

-10 -8 -6 -4 -2 0 2 4 6 8 10 0

100

200

300

400 500 dMom5 Nent = 336 Mean = -0.216 RMS = 0.3971 Chi2 / ndf = 76.17 / 33 10.07 ± Const = 487.5 0.005267 ± Mean = -0.2331 0.004558 ± Sigma = 0.3362

P= 6.7 GeV/c

dMom5

± ± ±

-10 -8 -6 -4 -2 0 2 4 6 8 10 0 20 40 60 80 100 120 140 160 180 dMom6 Nent = 188 Mean = -0.1517 RMS = 0.3716 Chi2 / ndf = 51.31 / 29 7.031 ± Const = 173.5 0.007487 ± Mean = -0.1978 0.00622 ± Sigma = 0.2382

P= 5.3 GeV/c

dMom6

± ± ±

[GeV/c] D3 -P D4P -10 -8 -6 -4 -2 0 2 4 6 8 10 0 2 4 6 8 10 12 14 16 dMom7 Nent = 30 Mean = -0.1256 RMS = 0.4772 Chi2 / ndf = 5.627 / 7 2.45 ± Const = 9.335 0.02714 ± Mean = -0.1915 0.03286 ± Sigma = -0.15

P= 3.9 GeV/c ± ± ±