) [GeV/c] D4 +P D3 0.5*(P

2 4 6 8 10 12

[GeV/c] D3 -P D4P

-10 -8 -6 -4 -2 0 2 4 6 8 10 dMomVsMomT3 Nent = 42127 Mean x = 5.237 Mean y = -0.0009081 RMS x = 1.266 RMS y = 0.2231

pp run #6194, 8 deg., 1/4B

) [GeV/c] D4 +P D3 0.5*(P

2 3 4 5 6 7 8 9 10 11

P / P Δ

0.02

0.025

0.03

0.035

0.04

Chi2 / ndf = 7.314 / 8 0.0009387 ± Const = 0.01002 0.0001646 ± Slope = 0.002029

Graph

± ±