slop deviation [radians]

-0.03 -0.02 -0.01 0 0.01 0.02 0.03

counts

0 5 10 15 20 25 30 35 40 DaxT4T5 Nent = 300 Mean = 0.001291 RMS = 0.006666 Chi2 / ndf = 10.62 / 6 3.539 ± Constant = 36.83 8.91e-05 ± Mean = -0.0001572 8.981e-05 ± Sigma = 0.001104

Zero Field Run #5840, 12 deg.

T4 vs. T5 ± ± ±

slop deviation [radians]

-0.03 -0.02 -0.01 0 0.01 0.02 0.03

counts

0

5

10

15

20

25

30

35 DayT4T5 Nent = 300 Mean = 0.0004898 RMS = 0.005472 Chi2 / ndf = 7.736 / 10 2.601 ± Constant = 28.39 0.000128 ± Mean = 0.0001378 0.0001366 ± Sigma = 0.001658 ± ± ±