slop deviation [radians]

-0.04 -0.03 -0.02 -0.01 0 0.01 0.02 0.03 0.04

counts

0 10 20 30 40 50 60 70 80 DaxT3T4 Nent = 614 Mean = 0.001405 RMS = 0.007626 Chi2 / ndf = 12.38 / 6 5.254 ± Constant = 75.08 6.653e-05 ± Mean = -7.16e-05 7.867e-05 ± Sigma = 0.001172

Zero Field Run #5840, 12 deg.

T3 vs. T4 ± ± ±

slop deviation [radians]

-0.06 -0.04 -0.02 0 0.02 0.04 0.06

counts

0

10

20

30

40

50

60 DayT3T4 Nent = 614 Mean = -0.0001384 RMS = 0.005494 Chi2 / ndf = 13.73 / 12 3.599 ± Constant = 57.46 8.136e-05 ± Mean = 0.0003698 7.527e-05 ± Sigma = 0.0016 ± ± ±