slop deviation [radians]

-0.06 -0.04 -0.02 0 0.02 0.04 0.06

counts

0 10 20 30 40 50 60 70 80 90 DaxT3T2 Nent = 1581 Mean = -0.001558 RMS = 0.01573 Chi2 / ndf = 10.4 / 14 3.672 ± Constant = 82.05 9.397e-05 ± Mean = -0.0001546 9.926e-05 ± Sigma = 0.002335

Zero Field Run #5840, 12 deg.

T3 vs. T2 ± ± ±

slop deviation [radians]

-0.06 -0.04 -0.02 0 0.02 0.04 0.06

counts

0 10 20 30 40 50 60 70

DayT3T2 Nent = 1581 Mean = 9.906e-05 RMS = 0.01134 Chi2 / ndf = 13.76 / 18 3 ± Constant = 66.16 0.0001401 ± Mean = -0.0006064 0.0001803 ± Sigma = 0.003312 3 ± ± ±