slop deviation [radians]

-0.04 -0.02 0 0.02 0.04

counts

0 10 20 30 40 50 60 70 80 DaxT3T4 Nent = 614 Mean = 0.001405 RMS = 0.007626 Chi2 / ndf = 12.38 / 6 5.254 ± Constant = 75.08 6.653e-05 ± Mean = -7.16e-05 7.866e-05 ± Sigma = 0.001172 ± ± ±

slop deviation [radians]

-0.04 -0.02 0 0.02 0.04

counts

0

10

20

30

40

50

60 DayT3T4 Nent = 614 Mean = -0.0001384 RMS = 0.005494 Chi2 / ndf = 63.78 / 27 3.614 ± Constant = 53.09 8.397e-05 ± Mean = 0.0004123 8.903e-05 ± Sigma = 0.001767

run #5840

± ± ±