slop deviation [radians]

-0.04 -0.02 0 0.02 0.04

counts

0

50

100

150

200

250

DaxT2T1 Nent = 4830 Mean = -0.001666 RMS = 0.01756 Chi2 / ndf = 10.95 / 8 8.241 ± Constant = 257.7 4.194e-05 ± Mean = -8.438e-05 4.488e-05 ± Sigma = 0.001484

Zero Field Run #5840, 12 deg.

T2 vs. T1 ± ± ±

slop deviation [radians]

-0.04 -0.02 0 0.02 0.04

counts

0

50

100

150

200

250 DayT2T1 Nent = 4830 Mean = -0.002159 RMS = 0.01511 Chi2 / ndf = 28.46 / 14 6.305 ± Constant = 216.2 5.448e-05 ± Mean = -0.001956 6.153e-05 ± Sigma = 0.002233 ± ± ±