0 2000 4000 6000 8000 10000 12000 14000

sμ counts/ trigger/

10^{-2}

10^{-1} 1 10 10^2

T3_1_V2_Time Nent = 645179 Mean = 4319 RMS = 734.2

run #5513, rotang=3 deg. run #5329, rotang=12 deg.

T3_1_V2_Time

0 2000 4000 6000 8000 10000 12000 14000

sμ counts/ trigger/

10^{-2}

10^{-1}

1

10 T4_1_V2_Time Nent = 138592 Mean = 4593 RMS = 1886

T4_1_V2_Time

tdc channel [500 ps]

0 2000 4000 6000 8000 10000 12000 14000

sμ counts/ trigger/

10^{-2}

10^{-1}

1

10 T5_1_V2_Time Nent = 195294 Mean = 5157 RMS = 2736

T5_1_V2_Time

T5_1_V2_Time