ped01 Entries 6252 Mean 263.2 RMS 3.814

0 50 100 150 200 250 300 350 400 450 500

1

10

10^2

10^3

RICH: Pedestal tube 1 ped110

Mean 222.8 RMS 36.71

tube 1

tube 100