1 1.5 2 2.5 3 0 0.5 1 1.5 2 2.5 3 3.5 hProton_yield Entries 0 Mean 1.206 RMS 0.4589 Underflow 0 Overflow 0 Integral 29.15

proton hProton_yield

pt (GeV/c)

1 1.5 2 2.5 3 0

0.5

1

1.5

2

2.5 hPbar_yield Entries 0 Mean 1.203 RMS 0.45 Underflow 0 Overflow 0 Integral 22.08

pbar hPbar_yield