-2 -1.5 -1 -0.5 0 0.5 1 1.5 2

counts

0 50 100 150 200 250 300 350 Chi2 / ndf = 42.51 / 18 14.55 ± Const = 311.4 0.001914 ± Mean = -0.06848 0.001699 ± Sigma = 0.05409

P= 1.55 GeV/c

Chi2 / ndf = 42.51 / 18 ± ± ±

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2 0 200 400 600 800 1000

1200

1400

1600

1800 Chi2 / ndf = 166.5 / 38

26.35 ± Const = 1635 0.001023 ± Mean = -0.08824 0.0009021 ± Sigma = 0.08417

P= 2.25 GeV/c

Chi2 / ndf = 166.5 / 38 ± ± ±

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2 0 200 400 600 800 1000

1200

1400 Chi2 / ndf = 145.6 / 41

19.24 ± Const = 1255 0.001368 ± Mean = -0.1088 0.001152 ± Sigma = 0.1162

P= 2.95 GeV/c

Chi2 / ndf = 145.6 / 41 ± ± ±

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2 0

100

200

300

400

500 Chi2 / ndf = 100.9 / 39 10.41 ± Const = 482.9 0.002583 ± Mean = -0.1324 0.002293 ± Sigma = 0.1597

P= 3.65 GeV/c ± ± ±

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2 0 20 40 60 80 100 120 140 160 180 200 Chi2 / ndf = 60.22 / 40 5.099 ± Const = 153.4 0.005207 ± Mean = -0.1525 0.00456 ± Sigma = 0.2079

P= 4.35 GeV/c

Chi2 / ndf = 60.22 / 40 ± ± ±

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2 0 10 20 30 40 50 60 70 80 Chi2 / ndf = 51.94 / 39 3.033 ± Const = 63.4 0.008861 ± Mean = -0.1801 0.007874 ± Sigma = 0.2465

P= 5.05 GeV/c

Chi2 / ndf = 51.94 / 39 ± ± ±

[GeV/c] D3 -P D4P -2 -1.5 -1 -0.5 0 0.5 1 1.5 2 0 5 10 15 20 25 30 35 Chi2 / ndf = 39.06 / 40 1.698 ± Const = 23.43 0.01763 ± Mean = -0.1907 0.01621 ± Sigma = 0.3079

P= 5.75 GeV/c^{Chi2 / ndf = 39.06 / 40 1.698±} ± ±