slope deviation [radians]

-0.1 -0.05 0 0.05 0.1

counts

0 20 40 60 80 100 120 140 DaxT4T5 Nent = 1489 Mean = -0.001517 RMS = 0.01153 Chi2 / ndf = 22.14 / 16 5.188 ± Constant = 140.4 5.336e-05 ± Mean = -0.0007626 4.785e-05 ± Sigma = 0.001834

run #5650 DaxT4T5

± ± ±

slope deviation [radians]

-0.1 -0.05 0 0.05 0.1

counts

0 20 40 60 80 100 120 140 160 180 200 DayT4T5 Nent = 1489 Mean = -2.095e-05 RMS = 0.01001 Chi2 / ndf = 34.42 / 16 6.984 ± Constant = 188.3 3.86e-05 ± Mean = -0.0004428 3.47e-05 ± Sigma = 0.00139 ± ± ±