dx [cm]

-20 -15 -10 -5 0 5 10 15 20

counts

0 10 20 30 40 50 60 70 DxT4T5 Nent = 1489 Mean = -0.665 RMS = 2.47 Chi2 / ndf = 24.12 / 28 2.585 ± Constant = 69.57 0.01179 ± Mean = -0.4836 0.01106 ± Sigma = 0.372 run #5650 DxT4T5

± ± ±

dy [cm]

-15 -10 -5 0 5 10 15

counts

0

20

40

60

80

100 DyT4T5 Nent = 1489 Mean = -0.111 RMS = 2.362 Chi2 / ndf = 22.79 / 24 3.206 ± Constant = 84.35 0.009376 ± Mean = -0.07248 0.009061 ± Sigma = 0.3042 ± ± ±