slope deviation [radians]

-0.1 -0.05 0 0.05 0.1

counts

0 20 40 60 80 100 120 140 160 180 200 220 DaxT2T3 Nent = 1905 Mean = 0.001015 RMS = 0.01381 Chi2 / ndf = 17.65 / 12 7.021 ± Constant = 202 4.107e-05 ± Mean = -4.793e-05 3.693e-05 ± Sigma = 0.001461

run #5650 DaxT2T3_{Nent = 1905}

± ± ±

slope deviation [radians]

-0.1 -0.05 0 0.05 0.1

counts

0 20 40 60 80 100 120 140 DayT2T3 Nent = 1905 Mean = 0.001025 RMS = 0.0148 Chi2 / ndf = 13.6 / 13 4.963 ± Constant = 137.9 6.673e-05 ± Mean = 0.001312 6.608e-05 ± Sigma = 0.002065 ± ± ±