dx [cm]

-20 -15 -10 -5 0 5 10 15

counts

0 20 40 60 80 100 120 140

DxT2T3 Nent = 1905 Mean = 0.2451 RMS = 3.245 Chi2 / ndf = 42.01 / 20 4.693 ± Constant = 132.3 0.00615 ± Mean = 0.1509 0.005917 ± Sigma = 0.2265

run #5650^{DxT2T3}_{Nent = 1905}

± ± ±

dy [cm]

-20 -15 -10 -5 0 5 10 15

counts

0

10

20

30

40

50

60

DyT2T3 Nent = 1905 Mean = -0.825 RMS = 3.262 Chi2 / ndf = 139.5 / 52 1.481 ± Constant = 45.66 0.01974 ± Mean = -0.7636 0.01524 ± Sigma = 0.6554 ± ± ±