Energy in Right ZDC (GeV)

0 100 200 300 400 500 600

Events

0

100

200

300

400

500 Reldis: E Right for EM Dissociation

.02 Reldis = .27 ± = .31 21R .01 Reldis = .12 ± = .08 31R

Veto Events with any multiplicity in Tiles,BB

Normalise to total number of event <650GeV