pHitSlatVsTrakTheta

Entries 1803 Mean 17.15 RMS 7.704 / ndf

2χ 22.59 / 17 p0 0.2253 ± 14.53 p1 0.01058 ± -0.6933

5 10 15 20 25 30 35 40 -6 -4 -2 0 2 4 6 8 10

± ±

theta angle vs slat with valid hit