/ ndf

2χ 46.15 / 17 Constant 5.839±

121.8 Mean 0.009902 ± 0.2252 Sigma 0.01012 ± 0.2923

-5 -4 -3 -2 -1 0 1 2 3 4 5 0 20 40 60 80 100 120 140 ± ±

FFS Dy Midplane matching (front - Back)