4 6 8 10 12 14 16 18 0.8

0.85

0.9

0.95

1

/ ndf

2χ 0.8043 / 15 Prob 1 p0 0.003121 ± 0.981 ±

proton = 0.9544-0.1038*exp(-0.193*x) pbar = 0.9386-0.1029*exp(-0.1784*x)

Absorption 0 FFS at 3

p(GeV/c)

6 8 10 12 14 16 18

0.8

0.85

0.9

0.95

1

1.05

/ ndf

2χ 1.582 / 12 Prob 0.9998 p0 0.004695 ± 0.9802 ± 0 FS at 3

proton = 0.995-0.2289*exp(-0.1105*x) pbar = 0.9637-0.271*exp(-0.148*x)

p(GeV/c)