p(GeV/c)

4 6 8 10 12 14 16 18

0.75 0.8 0.85 0.9 0.95 1 1.05

/ ndf

2χ 1.461 / 13 Prob 1 p0 0.009284 ± 0.9544 p1 0.03806 ± -0.1038 p2 0.1042 ± 0.193 ± ± ±

0 Proton at FFS 3

0.002214 ± ms(p0) = 0.9986

absorption

(p0+p1*exp(-p2*x)

p(GeV/c)

6 8 10 12 14 16 18

0.75 0.8 0.85 0.9 0.95 1 1.05

/ ndf

2χ 1.696 / 10 Prob 0.9982 p0 0.05661 ± 0.995 p1 0.04654 ± -0.2289 p2 0.09264 ± 0.1105 ± ± ±

0.003423 ± ms(p0) = 0.9998 0 Proton at FS 3

absorption