p(GeV/c)

4 6 8 10 12 14 16 18 0.8

0.85

0.9

0.95

1

1.05

/ ndf

2χ 2.921 / 13 Prob 0.9982 p0 0.01073 ± 0.9386 p1 0.03395 ± -0.1029 p2 0.1007 ± 0.1784 ± ± ±

0.002215 ± ms(p0) = 0.9988

absorption

p0+p1*exp(-p2*x)

0 Pbar at FFS 3

p(GeV/c)

6 8 10 12 14 16 18

0.75 0.8 0.85 0.9 0.95 1 1.05

/ ndf

2χ 1.565 / 10 Prob 0.9987 p0 0.03406 ± 0.9637 p1 0.096±

-0.271 p2 0.09209 ± 0.148 ± ±

0.003423 ± ms(p0) = 1 0 Pbar at FS 3

absorption