fNMRSTracks

0 2 4 6 8 10 12 14 16 18 20 22 24 1

10

10^2

10^3

10^4

10^5 htemp Nent = 188365 Mean = 0.2758 RMS = 0.8467

fNMRSTracks_{htemp}