[cm] zV -40 -30 -20 -10 0 10 20 30 40

cut M

0

200

400

600

800

1000

1200 5% [TMA]

10% [TMA] 15% [TMA] 20% [TMA]

30% [TMA] 40% [TMA] 50% [TMA]

[cm] zV -40 -30 -20 -10 0 10 20 30 40

cut M

0 100 200 300 400 500 600 700 800 5% [SMA]

10% [SMA] 15% [SMA] 20% [SMA]

30% [SMA] 40% [SMA] 50% [SMA]