[cm] zV -40 -20 0 20 40

/ N cent N

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0.45 0.5 0.55 0.6 0.65

BrTileCentModule 0-50%

0-40%

0-30%

0-20% 0-15% 0-10% 0-5%

[cm] zV -40 -20 0 20 40

/ N cent N

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0.45 0.5 0.55 0.6 0.65

BrSiCentModule 0-50%

0-40%

0-30%

0-20% 0-15% 0-10% 0-5%

[cm] zV -40 -20 0 20 40

/ N cent N

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0.45 0.5 0.55 0.6 0.65

BrMultCentModule 0-50%

0-40%

0-30%

0-20% 0-15% 0-10% 0-5%