cm -20 -15 -10 -5 0 5 10 15 20 0 100 200 300 400 500 600 700 h1 Nent = 95796 Mean = -1.424 RMS = 5.098 Chi2 / ndf = 749.8 / 494 5.271 ± cons1 = 473.4 0.02395 ± Mean1 = -1.066 0.03119 ± sigma1 = 3.053 5.027 ± cons2 = 148.3 0.0482 ± Mean2 = -2.092 0.0716 ± sigma2 = 6.911

Z_ZDC - Z_TPM1^{h1}_{Nent = 95796}

± ± ± ± ± ±

Software offset: 26.5 cm

Mean1 = -1.066 cm Total offset: 27.6 cm

Fit with a double gaussian