VertexBB-VertexTPM1, [cm]

-40 -30 -20 -10 0 10 20 30 40

Entr.

0

500

1000

1500

2000

2500

Nent = 73969 Constant = 2304 Mean = -0.0357 Sigma = 2.026

BBminTPM1_Big Nent = 73969

ProjectionX all

VertexBB-VertexTPM1, [cm]

-40 -30 -20 -10 0 10 20 30 40

Tiles Mult.

0

500

1000

1500

2000

2500

3000

3500

4000

Nent = 73969

Centr_vs_BBminTPM1_Big^{Nent = 73969}

VertexBB-VertexTPM1, [cm]

-40 -30 -20 -10 0 10 20 30 40

Entr.

0 20 40 60 80 100 120 140 160 180

Nent = 976 Constant = 152.1 Mean = -0.4644 Sigma = 1.401

Centr_vs_BBminTPM1_Big Nent = 976

ProjectionX 1000<TilesMult<1100

2530_2484_ZdcSlew_20_NoMIP_Zlt30_BEST.hst