BB Vertex - Matched Track Projection in Z (cm)

-10 -5 0 5 10

BB Multiplicity

0 20 40 60 80 100 120

Chi2 / ndf = 1.125 / 18 6.485 ± p0 = 52.94 1.686 ± p1 = 7.244 0.1178 ± p2 = 0.0161 0.02221 ± p3 = -0.0397

BB Multiplicity vs Vtx diff. for matched tracks

± ± ± ±