0 500 1000

1500

2000

2500

3000

3500

4000

2 4 6 8 10 12 14 16

20

40

60

80

100

row T2 Nent = 3838534 Mean x = 10.96 Mean y = 69.41 RMS x = 4.969 RMS y = 29.5

Number of sequences for each pad row T2