η -5 -4 -3 -2 -1 0 1 2 3 4 5 η dN/d

0 100 200 300 400 500 600 0-6 % Central

6-20% Central

Silicon Strip Detector Scintillator Tile Detector Beam Beam Detector HIJING Model Prediction