ϕ(1020) Measur ement QGP ^{Chiral Symmetry Restorat ion}

ϕ production enchancement, mass and width shift

ϕ Κ^+Κ^− Channel at the Mid-Rapidity Spectrometer

Accepted y - p_t distributions (Inlets : Pt)

Accepted K^+K^− mass (dots : combinatorial background) (Inlets : signal − background)

34^o 90^o

34^o 90^o_{with δp/p =1%}

y

Pt(GeV/c) m(K^+K^− )(GeV/c^2)

Events / 0.002GeV/c 2

Γ(ϕ)~7.5 MeV/c2