Char ged Particle Multiplicities

GEANT Simulations with 400 Central Au+Au fr om VENUS

Forwar d Spectr ometer For the 7.5 - 15 GeV/c setting at 2.1^o Detector N_{total} particles/cm^2

N_{primary} N_{secondary}

T2 7.6 0.02

4.1 3.5 T3 2.7 4.4 7.1 0.007 T4 1.5 0.8 2.4 0.002 T5 1.0 0.5 1.6 0.001

For the 15 - 30 GeV/c setting at 2.1^o

T2 2.2 2.5 4.7 0.01 T3 1.2 4.6 5.9 0.006 T4 0.6 1.0 1.6 0.001 T5 0.3 0.5 0.8 0.0004

For the 2 - 5 GeV/c setting at 2.1^o

T1 6.6 10.0 16.5 0.04 T2 2.4 1.4 3.8 0.01

Mid-Rapidity Spectr ometer At 34^o

TPC1 101 12 113 0.19 TPC2 7 2 9 0.01 TOFW 7 5 12

TPC1 30 5 35 0.05 TPC2 2 1 3 0.003 TPFW 2 1.4 3.4

At 90^o