R(fm) R(fm) q(GeV/c)

C(q)δλδR(fm)

Sour ce

34^o

statistical err or only

At the Mid-Rapidity Spectrometer

π^+π^+ corr elations fr om a Gaussian sour ce with a radius of 5 fm .

Measurement of the Dimensions (s,t) of the Interaction region (Source) π_1

π_2 x_1

x_2

*

Bose-Einstein Corr elations

where λ = Chaoticity Parameter (Incoherence Parameter)

C(q) = 1 + λ exp(− q^2R^2 − q^2_0τ^2) *