Acceptance of BRAHMS

π

K

p

Region I : With the full Forward Arm Region II : With the D1 - D2 (Forward Arm) Complex alone Region III : With the Mid-Rapidity Arm

(y) y_{beam}

Spectrometer Angles

Particle Momenta

Geometrical Acceptance + PID

Rapidity (y)

Pt (GeV/c)